0.5 1 1.5 2

-100

-50

0

50 -18 hours voltage (uV)

0.5 1 1.5 2

-100

-50

0

50 -12 hours

0.5 1 1.5 2

-100

-50

0

50 -6 hours

0.5 1 1.5 2

-100

-50

0

50 0 hours

0.5 1 1.5 2

-100

-50

0

50 6 hours

0.5 1 1.5 2

-100

-50

0

50 12 hours

0.5 1 1.5 2

-100

-50

0

50 18 hours

0.5 1 1.5 2

-100

-50

0

50 24 hours

0.5 1 1.5 2

-100

-50

0

50 30 hours

0.5 1 1.5 2

-100

-50

0

50 36 hours

0.5 1 1.5 2

-100

-50

0

50 42 hours

0.5 1 1.5 2

-100

-50

0

50 48 hours

0.5 1 1.5 2

-100

-50

0

50 54 hours

time (ms)

0.5 1 1.5 2

-100

-50

0

50 60 hours

time (ms)

0.5 1 1.5 2

-100

-50

0

50 66 hours

time (ms)

0.5 1 1.5 2

-100

-50

0

50 72 hours

time (ms)