1 2 3 4 5 6 7 8 9 10 11 0

10

20

30

40

50

60

Cell mEPSC Amplitude (pA)

treatment window: 16-18DIV

n = 58 mu = 17.12pA n = 56 mu = 12.26pA n = 173 mu = 12.12pA n = 48 mu = 20.9pA n = 57 mu = 25.41pA n = 87 mu = 58.8pA n = 24 mu = 22.6pA n = 62 mu = 23.65pA n = 12 mu = 19.78pA n = 30 mu = 26.38pA n = 6 mu = 36pA

Control CNQX-treated