0 200 400 600 800 1000 1200 1400 1600 1800 0 200 400 600 800 1000

1200

1400

1600

1800

2000

time (sec)

Array-Wide Spike Rate (sec -1)

First 30 Minutes of Optical Stimulation (λ = 2Hz)

0 200 400 600 800 1000 1200 1400 1600 1800 0 200 400 600 800 1000

1200

1400

1600

1800

2000

time (sec)

Last 30 Minutes of Spontaneous Recording